[#BloombergLP-balb-PipeControlChannel_CStringUtil-flatten-060]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/PipeControlChannel_CStringUtil.adoc[PipeControlChannel&lowbar;CStringUtil]::flatten
:relfileprefix: ../../../
:mrdocs:

Produce a compile&hyphen;time error informing the caller that the parameterized `TYPE` is not supported as the parameter for the call&period;

== Synopsis

Declared in `&lt;balb&lowbar;pipecontrolchannel&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;class TYPE&gt;
static
char const*
flatten(TYPE const& value);
----

== Return Value

never returns&semi; this overload causes a compile&hyphen;time error

== Parameters

[cols="1,4"]
|===
| Name| Description
| *value*
| object of an unsupported type
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
