[#BloombergLP-balb-PerformanceMonitor-Statistics-reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/PerformanceMonitor.adoc[PerformanceMonitor]::xref:BloombergLP/balb/PerformanceMonitor/Statistics.adoc[Statistics]::reset
:relfileprefix: ../../../../
:mrdocs:

Reset this object so that no samples have been collected&period;

== Synopsis

Declared in `&lt;balb&lowbar;performancemonitor&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset();
----

== Description

Note that although this method is public, it can&apos;t be called directly by users, since `PerformanceMonitor` provides only const access to statistics&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
