[#BloombergLP-balb-PerformanceMonitor-Statistics-latestValue]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/PerformanceMonitor.adoc[PerformanceMonitor]::xref:BloombergLP/balb/PerformanceMonitor/Statistics.adoc[Statistics]::latestValue
:relfileprefix: ../../../../
:mrdocs:

Return the latest collected value for the specified `measure`, or 0 if no values are yet available&period;

== Synopsis

Declared in `&lt;balb&lowbar;performancemonitor&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
double
latestValue(xref:BloombergLP/balb/PerformanceMonitor/Measure.adoc[Measure] measure) const;
----

== Return Value

latest collected value for `measure`, or 0 if unavailable

== Parameters

[cols="1,4"]
|===
| Name| Description
| *measure*
| performance measure whose latest value is returned
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
