[#BloombergLP-balb-PerformanceMonitor-Statistics-2constructor-0b]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/PerformanceMonitor.adoc[PerformanceMonitor]::xref:BloombergLP/balb/PerformanceMonitor/Statistics.adoc[Statistics]::Statistics
:relfileprefix: ../../../../
:mrdocs:

Create a `Statistics` object with the same values as `original`&period;

== Synopsis

Declared in `&lt;balb&lowbar;performancemonitor&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
Statistics(
    xref:BloombergLP/balb/PerformanceMonitor/Statistics.adoc[Statistics] const& original,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

== Description

Create a `Statistics` object aggregating the same statistics values as the specified `original` object&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *original*
| object providing the statistics values to copy
| *basicAllocator*
| memory allocator&semi; null uses the default
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
