[#mp_units-uniform_int_distribution-08-param-05]
= xref:mp_units.adoc[mp&lowbar;units]::xref:mp_units/uniform_int_distribution-08.adoc[uniform&lowbar;int&lowbar;distribution]::param
:relfileprefix: ../../
:mrdocs:

Sets the parameter set of the distribution&period;

== Synopsis

Declared in `&lt;bits&sol;uniform&lowbar;int&lowbar;dist&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
param(param&lowbar;type const& &lowbar;&lowbar;param);
----

== Parameters

[cols="1,4"]
|===
|Name|Description

| *&lowbar;&lowbar;param*
| The new parameter set of the distribution&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
