[#HANDLE_DW_SECT]
= HANDLE&lowbar;DW&lowbar;SECT
:mrdocs:

Denotes a value read from an index section that does not correspond to any of the supported standards&period;

== Synopsis

Declared in `&lt;llvm&sol;DebugInfo&sol;DWARF&sol;DWARFUnitIndex&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
#define HANDLE&lowbar;DW&lowbar;SECT(ID, NAME)

----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
