[#GET_RUNTIME_LIBCALL_FP_SELECTOR_DECLS]
= GET&lowbar;RUNTIME&lowbar;LIBCALL&lowbar;FP&lowbar;SELECTOR&lowbar;DECLS
:mrdocs:

The floating&hyphen;point selectors get&lt;OP&gt;(EVT) return the &lt;OP&gt; libcall for the given type, or UNKNOWN&lowbar;LIBCALL&period; Generated from the RuntimeLibcallFamily table in RuntimeLibcalls&period;td&period;

== Synopsis

Declared in `&lt;llvm&sol;CodeGen&sol;RuntimeLibcallUtil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
#define GET&lowbar;RUNTIME&lowbar;LIBCALL&lowbar;FP&lowbar;SELECTOR&lowbar;DECLS

----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
