[#prevector-01-STATIC_SIZE]
= xref:prevector-01.adoc[prevector&lt;36, unsigned char&gt;]::STATIC&lowbar;SIZE
:relfileprefix: ../
:mrdocs:

Number of elements stored inline before switching to heap allocation&period;

== Synopsis

Declared in `&lt;prevector&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr static
unsigned int STATIC&lowbar;SIZE;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
