[#base_uint-0d-EqualTo]
= xref:base_uint-0d.adoc[base&lowbar;uint&lt;256&gt;]::EqualTo
:relfileprefix: ../
:mrdocs:

Tests whether the value equals a 64&hyphen;bit unsigned number&period;

== Synopsis

Declared in `&lt;arith&lowbar;uint256&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
EqualTo(uint64&lowbar;t b) const;
----

== Return Value

True if this value equals `b,` otherwise false&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *b*
| The value to compare against&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
