[#V2Transport-GetSendMemoryUsage]
= xref:V2Transport.adoc[V2Transport]::GetSendMemoryUsage
:relfileprefix: ../
:mrdocs:

Return the memory used by buffered send data&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f2e2b0f2728), requires&lowbar;capability(0x7f2e2aa3bf98), requires&lowbar;capability(0x7f2e22e7c418), requires&lowbar;capability(0x7f2e26d28fe8), requires&lowbar;capability(0x7f2e20d4aa38), requires&lowbar;capability(0x7f2e2af17968), requires&lowbar;capability(0x7f2e4317dbe8), requires&lowbar;capability(0x7f2e21e51118), requires&lowbar;capability(0x7f2e1b876768), requires&lowbar;capability(0x7f2e35f9dfd8), requires&lowbar;capability(0x7f2e4396d328)&rsqb;&rsqb;
virtual
size&lowbar;t
GetSendMemoryUsage() const noexcept override;
----

== Return Value

the number of bytes held in send buffers&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
