[#ThreadPool-WorkersCount]
= xref:ThreadPool.adoc[ThreadPool]::WorkersCount
:relfileprefix: ../
:mrdocs:

Reports the number of active worker threads&period;

== Synopsis

Declared in `&lt;util&sol;threadpool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f2e2046a9a8)&rsqb;&rsqb;
size&lowbar;t
WorkersCount();
----

== Return Value

the number of running workers


[.small]#Created with https://www.mrdocs.com[MrDocs]#
