[#ThreadPool-WorkQueueSize]
= xref:ThreadPool.adoc[ThreadPool]::WorkQueueSize
:relfileprefix: ../
:mrdocs:

Reports the number of tasks currently waiting in the queue&period;

== Synopsis

Declared in `&lt;util&sol;threadpool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f2e2046a868)&rsqb;&rsqb;
size&lowbar;t
WorkQueueSize();
----

== Return Value

the number of queued, not&hyphen;yet&hyphen;started tasks


[.small]#Created with https://www.mrdocs.com[MrDocs]#
