[#ReachableNets-Reset]
= xref:ReachableNets.adoc[ReachableNets]::Reset
:relfileprefix: ../
:mrdocs:

Reset the reachable networks to the default set&period;

== Synopsis

Declared in `&lt;netbase&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f2e3b6cb688), requires&lowbar;capability(0x7f2e2a4e7348), requires&lowbar;capability(0x7f2e283bb058), requires&lowbar;capability(0x7f2e2226cdd8), requires&lowbar;capability(0x7f2e26119458), requires&lowbar;capability(0x7f2e426902a8), requires&lowbar;capability(0x7f2e20fbe7b8), requires&lowbar;capability(0x7f2e291377f8), requires&lowbar;capability(0x7f2e41714288), requires&lowbar;capability(0x7f2e409b7fb8), requires&lowbar;capability(0x7f2e18117108), requires&lowbar;capability(0x7f2e3674fc58), requires&lowbar;capability(0x7f2e33b879b8), requires&lowbar;capability(0x7f2e12856448), requires&lowbar;capability(0x7f2e29e25828)&rsqb;&rsqb;
void
Reset();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
