[#ChainstateManager-ActiveHeight]
= xref:ChainstateManager.adoc[ChainstateManager]::ActiveHeight
:relfileprefix: ../
:mrdocs:

Return the height of the active chain tip&period;

== Synopsis

Declared in `&lt;validation&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f2e1bc173f8), requires&lowbar;capability(0x7f2e146b5748), requires&lowbar;capability(0x7f2e298fab18), requires&lowbar;capability(0x7f2e360b8278)&rsqb;&rsqb;
int
ActiveHeight() const;
----

== Return Value

The height of the active chain tip&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
