[#CTxMemPool-m_load_tried]
= xref:CTxMemPool.adoc[CTxMemPool]::m&lowbar;load&lowbar;tried
:relfileprefix: ../
:mrdocs:

whether an attempt to load the persisted mempool has been made

== Synopsis

Declared in `&lt;txmempool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;guarded&lowbar;by(0x7f2e1b5a1298), guarded&lowbar;by(0x7f2e2721a2a8), guarded&lowbar;by(0x7f2e421cb9b8), guarded&lowbar;by(0x7f2e2880a978), guarded&lowbar;by(0x7f2e3212dd08), guarded&lowbar;by(0x7f2e347f6398), guarded&lowbar;by(0x7f2e2b05a808), guarded&lowbar;by(0x7f2e2bee1ea8)&rsqb;&rsqb;
bool m&lowbar;load&lowbar;tried = &lcub;false&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
