[#CTxMemPool-GetSequence]
= xref:CTxMemPool.adoc[CTxMemPool]::GetSequence
:relfileprefix: ../
:mrdocs:

Returns the current mempool sequence number without incrementing it&period;

== Synopsis

Declared in `&lt;txmempool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f2e1b5a3658), requires&lowbar;capability(0x7f2e2721c668), requires&lowbar;capability(0x7f2e421cdd78), requires&lowbar;capability(0x7f2e2880cd38), requires&lowbar;capability(0x7f2e321300c8), requires&lowbar;capability(0x7f2e347f8758), requires&lowbar;capability(0x7f2e2b05cbc8), requires&lowbar;capability(0x7f2e2bee4268)&rsqb;&rsqb;
uint64&lowbar;t
GetSequence() const;
----

== Return Value

The current sequence number&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
