[#CTxMemPool-GetAndIncrementSequence]
= xref:CTxMemPool.adoc[CTxMemPool]::GetAndIncrementSequence
:relfileprefix: ../
:mrdocs:

Guards this internal counter for external reporting

== Synopsis

Declared in `&lt;txmempool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f2e1b5a3598), requires&lowbar;capability(0x7f2e2721c5a8), requires&lowbar;capability(0x7f2e421cdcb8), requires&lowbar;capability(0x7f2e2880cc78), requires&lowbar;capability(0x7f2e32130008), requires&lowbar;capability(0x7f2e347f8698), requires&lowbar;capability(0x7f2e2b05cb08), requires&lowbar;capability(0x7f2e2bee41a8)&rsqb;&rsqb;
uint64&lowbar;t
GetAndIncrementSequence() const;
----

== Return Value

The current sequence number before incrementing it&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
