[#CThreadInterrupt-operator_call]
= xref:CThreadInterrupt.adoc[CThreadInterrupt]::operator()
:relfileprefix: ../
:mrdocs:

Interrupt any sleeps&period; After this `interrupted()` will return `true`&period;

== Synopsis

Declared in `&lt;util&sol;threadinterrupt&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f2e18c12cf0), requires&lowbar;capability(0x7f2e327183d0), requires&lowbar;capability(0x7f2e2a3014d0), requires&lowbar;capability(0x7f2e37b295c0), requires&lowbar;capability(0x7f2e22088be0), requires&lowbar;capability(0x7f2e25f35960), requires&lowbar;capability(0x7f2e42e836b0), requires&lowbar;capability(0x7f2e225a5230), requires&lowbar;capability(0x7f2e36bf5d90), requires&lowbar;capability(0x7f2e2253cc10), requires&lowbar;capability(0x7f2e2390cb90), requires&lowbar;capability(0x7f2e1be63b40), requires&lowbar;capability(0x7f2e188a4d20), requires&lowbar;capability(0x7f2e28582f60), requires&lowbar;capability(0x7f2e26d324b0), requires&lowbar;capability(0x7f2e1d2cbcb0), requires&lowbar;capability(0x7f2e08467b90), requires&lowbar;capability(0x7f2e1c59e8a0), requires&lowbar;capability(0x7f2e38a13550), requires&lowbar;capability(0x7f2e3302a940), requires&lowbar;capability(0x7f2e2392c770), requires&lowbar;capability(0x7f2e35becfa0), requires&lowbar;capability(0x7f2e1e8adc40)&rsqb;&rsqb;
virtual
void
operator()();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
