[#CConnman-Interrupt]
= xref:CConnman.adoc[CConnman]::Interrupt
:relfileprefix: ../
:mrdocs:

Interrupt any blocking operations so the manager can shut down&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f2e2b748310), requires&lowbar;capability(0x7f2e28941020), requires&lowbar;capability(0x7f2e234d0200), requires&lowbar;capability(0x7f2e2737c9a0), requires&lowbar;capability(0x7f2e235ee030), requires&lowbar;capability(0x7f2e2a34a120), requires&lowbar;capability(0x7f2e219f6ef0), requires&lowbar;capability(0x7f2e21c81db0), requires&lowbar;capability(0x7f2e1aa34910), requires&lowbar;capability(0x7f2e376b69f0), requires&lowbar;capability(0x7f2e433cc580)&rsqb;&rsqb;
void
Interrupt();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
