[#CConnman-GetOutboundTargetBytesLeft]
= xref:CConnman.adoc[CConnman]::GetOutboundTargetBytesLeft
:relfileprefix: ../
:mrdocs:

response the bytes left in the current max outbound cycle in case of no limit, it will always response 0

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f2e2b74a428), requires&lowbar;capability(0x7f2e28943138), requires&lowbar;capability(0x7f2e234d2318), requires&lowbar;capability(0x7f2e2737eab8), requires&lowbar;capability(0x7f2e235f0148), requires&lowbar;capability(0x7f2e2a34c238), requires&lowbar;capability(0x7f2e219f9008), requires&lowbar;capability(0x7f2e21c83ec8), requires&lowbar;capability(0x7f2e1aa36a28), requires&lowbar;capability(0x7f2e376b8b08), requires&lowbar;capability(0x7f2e433ce698)&rsqb;&rsqb;
uint64&lowbar;t
GetOutboundTargetBytesLeft() const;
----

== Return Value

the number of bytes left in the current cycle, or 0 if there is no limit&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
