[#CConnman-GetMaxOutboundTimeLeftInCycle]
= xref:CConnman.adoc[CConnman]::GetMaxOutboundTimeLeftInCycle
:relfileprefix: ../
:mrdocs:

Return the time left in the current max&hyphen;outbound cycle (0 if there is no limit)&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f2e2b74a568), requires&lowbar;capability(0x7f2e28943278), requires&lowbar;capability(0x7f2e234d2458), requires&lowbar;capability(0x7f2e2737ebf8), requires&lowbar;capability(0x7f2e235f0288), requires&lowbar;capability(0x7f2e2a34c378), requires&lowbar;capability(0x7f2e219f9148), requires&lowbar;capability(0x7f2e21c84008), requires&lowbar;capability(0x7f2e1aa36b68), requires&lowbar;capability(0x7f2e376b8c48), requires&lowbar;capability(0x7f2e433ce7d8)&rsqb;&rsqb;
std::chrono::seconds
GetMaxOutboundTimeLeftInCycle() const;
----

== Return Value

the time left in the current max&hyphen;outbound cycle, or 0 if there is no limit&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
