[#CBlockIndex-nStatus]
= xref:CBlockIndex.adoc[CBlockIndex]::nStatus
:relfileprefix: ../
:mrdocs:

Verification status of this block&period; See enum BlockStatus

== Synopsis

Declared in `&lt;chain&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;guarded&lowbar;by(0x7f2e18da6748), guarded&lowbar;by(0x7f2e18c0a8a8), guarded&lowbar;by(0x7f2e3219cd08), guarded&lowbar;by(0x7f2e34801138), guarded&lowbar;by(0x7f2e331bb598), guarded&lowbar;by(0x7f2e32e734f8), guarded&lowbar;by(0x7f2e42eece48), guarded&lowbar;by(0x7f2e2ad457b8), guarded&lowbar;by(0x7f2e318b8038), guarded&lowbar;by(0x7f2e283edf98), guarded&lowbar;by(0x7f2e29d403a8)&rsqb;&rsqb;
uint32&lowbar;t nStatus = &lcub;0&rcub;;
----

== Description

Note&colon; this value is modified to show BLOCK&lowbar;OPT&lowbar;WITNESS during UTXO snapshot load to avoid a spurious startup failure requiring &hyphen;reindex&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
