[#BCLog-Logger-DisconnectTestLogger]
= xref:BCLog.adoc[BCLog]::xref:BCLog/Logger.adoc[Logger]::DisconnectTestLogger
:relfileprefix: ../../
:mrdocs:

Only for testing

== Synopsis

Declared in `&lt;logging&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f2e43eece78)&rsqb;&rsqb;
void
DisconnectTestLogger();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
