[#bsl-operator_us-0b9]
= xref:bsl.adoc[bsl]::operator&quot;&quot;&lowbar;us
:relfileprefix: ../
:mrdocs:

`operator&quot;&quot;&lowbar;us` overloads

== Synopses

Declared in `&lt;bslstl&lowbar;chrono&period;h&gt;`

Same as the preceding overload, for a `long double` argument&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
bsl::chrono::duration&lt;long double, std::micro&gt;
xref:bsl/operator_us-0be.adoc[operator&quot;&quot;&lowbar;us](long double us);
----

[.small]#xref:bsl/operator_us-0be.adoc[_» more&period;&period;&period;_]#

Create a `bsl&colon;&colon;chrono&colon;&colon;duration` object having the `bsl&colon;&colon;micro` duration period and initialized with the specified `us` number of microseconds&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
std::chrono::microseconds
xref:bsl/operator_us-04.adoc[operator&quot;&quot;&lowbar;us](unsigned long long us);
----

[.small]#xref:bsl/operator_us-04.adoc[_» more&period;&period;&period;_]#


[.small]#Created with https://www.mrdocs.com[MrDocs]#
