[#bsl-allocator_traits-064-is_always_equal]
= xref:bsl.adoc[bsl]::xref:bsl/allocator_traits-064.adoc[allocator&lowbar;traits&lt;allocator&lt;float&gt;&gt;]::is&lowbar;always&lowbar;equal
:relfileprefix: ../../
:mrdocs:

== Synopsis

Declared in `&lt;bslma&lowbar;bslallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef xref:bsl/false_type.adoc[false&lowbar;type] is&lowbar;always&lowbar;equal;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
