[#BloombergLP-operator_not_eq-0e]
= xref:BloombergLP.adoc[BloombergLP]::operator!&equals;
:relfileprefix: ../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` selection info objects do not have the same value, and `false` otherwise&period; Two selection info objects do not have the same value if at least one of their respective properties is not identical&period;

== Synopsis

Declared in `&lt;bdlat&lowbar;selectioninfo&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/bdlat_SelectionInfo.adoc[bdlat&lowbar;SelectionInfo] const& lhs,
    xref:BloombergLP/bdlat_SelectionInfo.adoc[bdlat&lowbar;SelectionInfo] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
