[#BloombergLP-bslx-TestInStream-setQuiet]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslx.adoc[bslx]::xref:BloombergLP/bslx/TestInStream.adoc[TestInStream]::setQuiet
:relfileprefix: ../../../
:mrdocs:

Set the quiet mode for this test stream to the specified (boolean) `flagValue`&period; If `flagValue` is `true`, then quiet mode is turned ON and no error messages will be written to standard output&period; If `flagValue` is `false`, then quiet mode is turned OFF&period; Note that quiet mode is turned OFF by default&period;

== Synopsis

Declared in `&lt;bslx&lowbar;testinstream&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
setQuiet(bool flagValue);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
