[#BloombergLP-bslx-GenericInStream-getUint8-08]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslx.adoc[bslx]::xref:BloombergLP/bslx/GenericInStream.adoc[GenericInStream]::getUint8
:relfileprefix: ../../../
:mrdocs:

Same as the related overload for `unsigned char&amp; variable`&period;

== Synopsis

Declared in `&lt;bslx&lowbar;genericinstream&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bslx/GenericInStream.adoc[GenericInStream&lt;STREAMBUF&gt;]&
getUint8(unsigned char& variable);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
