[#BloombergLP-bsltf-operator_not_eq-0e]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `false` because `StdTestAllocator` does not hold a state&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;stdtestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;
    class TYPE1,
    class TYPE2&gt;
bool
operator!&equals;(
    xref:BloombergLP/bsltf/StdTestAllocator-05.adoc[StdTestAllocator&lt;TYPE1&gt;] const& lhs,
    xref:BloombergLP/bsltf/StdTestAllocator-05.adoc[StdTestAllocator&lt;TYPE2&gt;] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
