[#BloombergLP-bsltf-operator_eq-007]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::operator&equals;&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` objects have the same value, and `false` otherwise&period; Two `MovableAllocTestType` objects have the same if their `data` attributes are the same&period; TBD&colon; think about the behavior when specified on an object that was moved&hyphen;from on this as well as other functions&sol;methods if appropriate&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;movablealloctesttype&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator&equals;&equals;(
    xref:BloombergLP/bsltf/MovableAllocTestType.adoc[MovableAllocTestType] const& lhs,
    xref:BloombergLP/bsltf/MovableAllocTestType.adoc[MovableAllocTestType] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
