[#BloombergLP-bsltf-TemplateTestFacility-emplace-0a]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::xref:BloombergLP/bsltf/TemplateTestFacility.adoc[TemplateTestFacility]::emplace
:relfileprefix: ../../../
:mrdocs:

Set the pointer&hyphen;to&hyphen;method at the specified `address` to the value of the specified `identifier`&period; The specified `allocator` is not used&period; The behavior is undefined unless `0 &lt;&equals; identifier &lt; 128`&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;templatetestfacility&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;class ALLOCATOR&gt;
static
void
emplace(
    xref:BloombergLP/bsltf/TemplateTestFacility/MethodPtr.adoc[MethodPtr]* address,
    int identifier,
    ALLOCATOR allocator);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
