[#BloombergLP-bsltf-StdTestAllocatorConfiguration]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::StdTestAllocatorConfiguration
:relfileprefix: ../../
:mrdocs:

This `struct` provides a namespace for functions that manipulate and access the _delegate allocator_ for `StdTestAllocator`&period; The delegate allocator is the allocator to which `StdTestAllocator` objects delegate their operations&period; The provided operations are _not_ thread&hyphen;safe&period; Note that this allocator is configured globally as C&plus;&plus;03 standard compliant allocators cannot have individually identifiable state&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;stdtestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
struct StdTestAllocatorConfiguration;
----

== Static Member Functions

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bsltf/StdTestAllocatorConfiguration/delegateAllocator.adoc[`delegateAllocator`] 
| Return the address of the delegate allocator&period; Note that, this method will initially return `&amp;bslma&lowbar;NewDeleteAllocator&colon;&colon;singleton()` if the `setDelegatingAllocator` class method has not been called&period;
| xref:BloombergLP/bsltf/StdTestAllocatorConfiguration/setDelegateAllocatorRaw.adoc[`setDelegateAllocatorRaw`] 
| Set the address of the delegate allocator to the specified `basicAllocator`&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
