[#BloombergLP-bsltf-StdTestAllocator-0e-pointer]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::xref:BloombergLP/bsltf/StdTestAllocator-0e.adoc[StdTestAllocator&lt;void&gt;]::pointer
:relfileprefix: ../../../
:mrdocs:

== Synopsis

Declared in `&lt;bsltf&lowbar;stdtestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef void* pointer;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
