[#BloombergLP-bsltf-StdTestAllocator-05-deallocate]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::xref:BloombergLP/bsltf/StdTestAllocator-05.adoc[StdTestAllocator]::deallocate
:relfileprefix: ../../../
:mrdocs:

Return memory previously at the specified `address` for `numElements` back to this allocator&period; The `numElements` argument is ignored by this allocator type&period; The behavior is undefined unless `address` was allocated using this allocator object and has not already been deallocated&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;stdtestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
deallocate(
    xref:BloombergLP/bsltf/StdTestAllocator-05/pointer.adoc[pointer] address,
    xref:BloombergLP/bsltf/StdTestAllocator-05/size_type.adoc[size&lowbar;type] numElements = 1);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
