[#BloombergLP-bsltf-AllocEmplacableTestType-isEqual]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::xref:BloombergLP/bsltf/AllocEmplacableTestType.adoc[AllocEmplacableTestType]::isEqual
:relfileprefix: ../../../
:mrdocs:

Return `true` if the specified `rhs` has the same value as this object, and `false` otherwise&period; Two `AllocEmplacableTestType` objects have the same value if each of their corresponding attributes have the same value&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;allocemplacabletesttype&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
isEqual(xref:BloombergLP/bsltf/AllocEmplacableTestType.adoc[AllocEmplacableTestType] const& rhs) const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
