[#BloombergLP-bsltf-AllocBitwiseMoveableTestType]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::AllocBitwiseMoveableTestType
:relfileprefix: ../../
:mrdocs:

This unconstrained (value&hyphen;semantic) attribute class that is bitwise&hyphen;moveable, uses a `bslma&colon;&colon;Allocator` to supply memory, and defines the type traits `bslma&colon;&colon;UsesBslmaAllocator` and `bslmf&colon;&colon;IsBitwiseMoveable`&period; See the  section for information on the class attributes&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;allocbitwisemoveabletesttype&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
class AllocBitwiseMoveableTestType;
----

== Member Functions

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bsltf/AllocBitwiseMoveableTestType/2constructor-03.adoc[`AllocBitwiseMoveableTestType`]         [.small]#[constructor]#
| Constructors
| xref:BloombergLP/bsltf/AllocBitwiseMoveableTestType/2destructor.adoc[`&#126;AllocBitwiseMoveableTestType`] [.small]#[destructor]#
| Destroy this object&period;
| xref:BloombergLP/bsltf/AllocBitwiseMoveableTestType/operator_assign.adoc[`operator&equals;`] 
| Assign to this object the value of the specified `rhs` object, and return a reference providing modifiable access to this object&period;
| xref:BloombergLP/bsltf/AllocBitwiseMoveableTestType/allocator.adoc[`allocator`] 
| Return the allocator used by this object to supply memory&period;
| xref:BloombergLP/bsltf/AllocBitwiseMoveableTestType/data.adoc[`data`] 
| Return the value of the `data` attribute of this object&period;
| xref:BloombergLP/bsltf/AllocBitwiseMoveableTestType/setData.adoc[`setData`] 
| Set the `data` attribute of this object to the specified `value`&period;
|===


== Non-Member Functions

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bsltf/debugprint-0c95d.adoc[`debugprint`]
| Same as the preceding overload for this test type&period;
| xref:BloombergLP/bsltf/operator_not_eq-079.adoc[`operator!&equals;`]
| Return `true` if the specified `lhs` and `rhs` objects do not have the same value, and `false` otherwise&period; Two `AllocBitwiseMoveableTestType` objects do not have the same value if their `data` attributes are not the same&period;
| xref:BloombergLP/bsltf/operator_eq-0c3.adoc[`operator&equals;&equals;`]
| Return `true` if the specified `lhs` and `rhs` objects have the same value, and `false` otherwise&period; Two `AllocBitwiseMoveableTestType` objects have the same if their `data` attributes are the same&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
