[#BloombergLP-bslstl-operator_not_eq-093]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslstl.adoc[bslstl]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` iterator does not have the same value as the specified `rhs` iterator, and `false` otherwise&period; Two iterators do not have the same value if (1) they do not refer to the same element and (2) both do not have the past&hyphen;the&hyphen;end iterator value for the underlying sequence&period; The behavior is undefined unless both iterators refer to the same underlying sequence&period;

== Synopsis

Declared in `&lt;bslstl&lowbar;randomaccessiterator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;
    class T1,
    class T2,
    class ITER&lowbar;IMP,
    class TAG&lowbar;TYPE&gt;
bool
operator!&equals;(
    xref:BloombergLP/bslstl/RandomAccessIterator.adoc[RandomAccessIterator&lt;T1, ITER&lowbar;IMP, TAG&lowbar;TYPE&gt;] const& lhs,
    xref:BloombergLP/bslstl/RandomAccessIterator.adoc[RandomAccessIterator&lt;T2, ITER&lowbar;IMP, TAG&lowbar;TYPE&gt;] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
