[#BloombergLP-bslstl-Function_Rep-get_allocator]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslstl.adoc[bslstl]::xref:BloombergLP/bslstl/Function_Rep.adoc[Function&lowbar;Rep]::get&lowbar;allocator
:relfileprefix: ../../../
:mrdocs:

Return the allocator used to supply memory for this object&period;

== Synopsis

Declared in `&lt;bslstl&lowbar;function&lowbar;rep&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bslstl/Function_Rep/allocator_type.adoc[bslstl::Function&lowbar;Rep::allocator&lowbar;type]
get&lowbar;allocator() const noexcept;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
