[#BloombergLP-bsls-operator_s]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::operator&quot;&quot;&lowbar;s
:relfileprefix: ../../
:mrdocs:

This user defined literal operator converts the specified `seconds` value to the respective `TimeInterval` value&period; The behavior is undefined unless the specified number of seconds can be converted to valid `TimeInterval` object&period; (See the &quot;User&hyphen;Defined Literals&quot; section in the component&hyphen;level documentation&period;)

== Synopsis

Declared in `&lt;bsls&lowbar;timeinterval&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
xref:BloombergLP/bsls/TimeInterval.adoc[bsls::TimeInterval]
operator&quot;&quot;&lowbar;s(unsigned long long seconds);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
