[#BloombergLP-bsls-operator_not_eq-0a]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Inequality operators

== Synopses

Declared in `&lt;bsls&lowbar;timeinterval&period;h&gt;`

Return `true` if the specified `lhs` and `rhs` time intervals do not have the same value, and `false` otherwise&period; Two time intervals do not have the same value if their respective second or nanosecond fields differ in value&period; The behavior is undefined unless operands of type `double` can be converted to valid `TimeInterval` objects&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
xref:BloombergLP/bsls/operator_not_eq-05.adoc[operator!&equals;](
    xref:BloombergLP/bsls/TimeInterval.adoc[TimeInterval] const& lhs,
    xref:BloombergLP/bsls/TimeInterval.adoc[TimeInterval] const& rhs);
----

[.small]#xref:BloombergLP/bsls/operator_not_eq-05.adoc[_» more&period;&period;&period;_]#

Same as the preceding overload, converting `rhs` from `double`&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
xref:BloombergLP/bsls/operator_not_eq-0ba.adoc[operator!&equals;](
    xref:BloombergLP/bsls/TimeInterval.adoc[TimeInterval] const& lhs,
    double rhs);
----

[.small]#xref:BloombergLP/bsls/operator_not_eq-0ba.adoc[_» more&period;&period;&period;_]#

Same as the preceding overload, converting `lhs` from `double`&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
xref:BloombergLP/bsls/operator_not_eq-0b7.adoc[operator!&equals;](
    double lhs,
    xref:BloombergLP/bsls/TimeInterval.adoc[TimeInterval] const& rhs);
----

[.small]#xref:BloombergLP/bsls/operator_not_eq-0b7.adoc[_» more&period;&period;&period;_]#


[.small]#Created with https://www.mrdocs.com[MrDocs]#
