[#BloombergLP-bsls-operator_minus-04]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::operator&hyphen;
:relfileprefix: ../../
:mrdocs:

Return a `TimeInterval` value that is the difference between the specified `lhs` and `rhs` time intervals&period; The behavior is undefined unless (1) operands of type `double` can be converted to valid `TimeInterval` objects, (2) the value on the right&hyphen;hand side (potentially after conversion to a `TimeInterval`) has a number of seconds that is not `LLONG&lowbar;MIN`, and (3) the resulting time interval can be represented with a 64&hyphen;bit signed integer&period;

== Synopsis

Declared in `&lt;bsls&lowbar;timeinterval&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bsls/TimeInterval.adoc[bsls::TimeInterval]
operator&hyphen;(
    xref:BloombergLP/bsls/TimeInterval.adoc[TimeInterval] const& lhs,
    xref:BloombergLP/bsls/TimeInterval.adoc[TimeInterval] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
