[#BloombergLP-bsls-TimeUtil-convertRawTime]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/TimeUtil.adoc[TimeUtil]::convertRawTime
:relfileprefix: ../../../
:mrdocs:

Convert the specified `rawTime` to a value in nanoseconds, referenced to an arbitrary but fixed origin, and return the result of the conversion&period; Note that this method is thread&hyphen;safe only if `initialize` has been called before&period;

== Synopsis

Declared in `&lt;bsls&lowbar;timeutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
xref:BloombergLP/bsls/Types/Int64.adoc[Types::Int64]
convertRawTime(xref:BloombergLP/bsls/TimeUtil/OpaqueNativeTime.adoc[OpaqueNativeTime] rawTime);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
