[#BloombergLP-bsls-TimeInterval_RepTraits-k_IS_FLOAT]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/TimeInterval_RepTraits.adoc[TimeInterval&lowbar;RepTraits]::k&lowbar;IS&lowbar;FLOAT
:relfileprefix: ../../../
:mrdocs:

`true` if `REP` is a floating&hyphen;point duration representation type&period;

== Synopsis

Declared in `&lt;bsls&lowbar;timeinterval&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool const k&lowbar;IS&lowbar;FLOAT = std&colon;&colon;is&lowbar;floating&lowbar;point&lt;REP&gt;&colon;&colon;value
                           &verbar;&verbar; std&colon;&colon;chrono&colon;&colon;treat&lowbar;as&lowbar;floating&lowbar;point&lt;REP&gt;&colon;&colon;value;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
