[#BloombergLP-bsls-TimeInterval_RepTraits]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::TimeInterval&lowbar;RepTraits
:relfileprefix: ../../
:mrdocs:

Trait metafunction that determines whether the specified `REP` type is considered a floating point type&period;

== Synopsis

Declared in `&lt;bsls&lowbar;timeinterval&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;class REP&gt;
struct TimeInterval&lowbar;RepTraits;
----

== Static Data Members

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bsls/TimeInterval_RepTraits/k_IS_FLOAT.adoc[`k&lowbar;IS&lowbar;FLOAT`] 
| `true` if `REP` is a floating&hyphen;point duration representation type&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
