[#BloombergLP-bsls-TimeInterval_DurationTraits-k_IS_FLOAT]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/TimeInterval_DurationTraits.adoc[TimeInterval&lowbar;DurationTraits]::k&lowbar;IS&lowbar;FLOAT
:relfileprefix: ../../../
:mrdocs:

This compile time constant is `true` if the `REP` (template type argument) is indicated to be a floating point type by the underlying library&period; Otherwise, if the underlying library does not consider `REP` floating point anywhere (see `TimeInterval&lowbar;RepTraits`), `k&lowbar;IS&lowbar;FLOAT` is `false`&period;

== Synopsis

Declared in `&lt;bsls&lowbar;timeinterval&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool const k&lowbar;IS&lowbar;FLOAT = TimeInterval&lowbar;RepTraits&lt;REP&gt;&colon;&colon;k&lowbar;IS&lowbar;FLOAT;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
