[#BloombergLP-bsls-TimeInterval_DurationTraits-k_IMPLICIT_CONVERSION_ENABLED]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/TimeInterval_DurationTraits.adoc[TimeInterval&lowbar;DurationTraits]::k&lowbar;IMPLICIT&lowbar;CONVERSION&lowbar;ENABLED
:relfileprefix: ../../../
:mrdocs:

This compile time constant is `true` if `std&colon;&colon;chrono&colon;&colon;duration&lt;REP, PERIOD&gt;` objects will be implicitly converted to `TimeInterval`, and `false` otherwise&period; This value is intended to be used with `enable&lowbar;if` to enable implicitly converting function overloads&period; Note that this boolean value is mutually exclusive with `k&lowbar;EXPLICIT&lowbar;CONVERION&lowbar;ENABLED` as in they will never be both `true` for the same `REP&quot; and `PERIOD&apos;, but they may be both `false` for floats&period;

== Synopsis

Declared in `&lt;bsls&lowbar;timeinterval&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool const k&lowbar;IMPLICIT&lowbar;CONVERSION&lowbar;ENABLED = !k&lowbar;IS&lowbar;FLOAT &amp;&amp;  k&lowbar;IS&lowbar;IMPLICIT;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
