[#BloombergLP-bsls-TimeInterval-setTotalMilliseconds]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/TimeInterval.adoc[TimeInterval]::setTotalMilliseconds
:relfileprefix: ../../../
:mrdocs:

Set the overall value of this object to indicate the specified integral number of `milliseconds`&period; Note that `milliseconds` may be negative&period;

== Synopsis

Declared in `&lt;bsls&lowbar;timeinterval&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
void
setTotalMilliseconds(xref:BloombergLP/bsls/Types/Int64.adoc[bsls::Types::Int64] milliseconds);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
