[#BloombergLP-bsls-SystemClockType-Enum]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/SystemClockType.adoc[SystemClockType]::Enum
:relfileprefix: ../../../
:mrdocs:

System clock type enumerators&period;

== Synopsis

Declared in `&lt;bsls&lowbar;systemclocktype&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum Enum;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `e&lowbar;REALTIME` 
| System clock that returns the current wall time maintained by the system, and which is affected by adjustments to the system&apos;s clock (i&period;e&period;, time values returned may jump &quot;forwards&quot; and &quot;backwards&quot; as the current time&hyphen;of&hyphen;day is changed on the system)&period;
| `e&lowbar;MONOTONIC` 
| System clock that returns the elapsed time since some unspecified starting point in the past&period; The returned values are monotonically non&hyphen;decreasing, and are generally not affected by changes to the system time&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
