[#BloombergLP-bsls-OutputRedirector-nonRedirectedStream]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/OutputRedirector.adoc[OutputRedirector]::nonRedirectedStream
:relfileprefix: ../../../
:mrdocs:

Return the value of the global `stdout` or `stderr` corresponding to the stream that is not intended to be redirected by this object&period;

== Synopsis

Declared in `&lt;bsls&lowbar;outputredirector&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
FILE*
nonRedirectedStream() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
