[#BloombergLP-bsls-AlignmentUtil-defaultAlignmentOfAlignedStorage]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/AlignmentUtil.adoc[AlignmentUtil]::defaultAlignmentOfAlignedStorage
:relfileprefix: ../../../
:mrdocs:

Return the default value of the alignment argument for `std&colon;&colon;aligned&lowbar;storage` when the size argument is the specified `t&lowbar;SIZE`&period; This function is an implementation detail of BDE and should not be used elsewhere&period;

== Synopsis

Declared in `&lt;bsls&lowbar;alignmentutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;std::size&lowbar;t t&lowbar;SIZE&gt;
constexpr
static
std::size&lowbar;t
defaultAlignmentOfAlignedStorage();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
